// :ks_include_id: 41158ab30242438694d2437566046d38
|Alias
|The alias of the DevOps project. Aliases can only contain Chinese characters, letters, numbers, and hyphens (-), cannot start or end with a hyphen (-), and can be up to 63 characters long.

|Description
|The description of the DevOps project. Descriptions can contain any characters and can be up to 256 characters long.